<template>
  <div class="component-wrapper">
    <el-table
      ref="dataList"
      v-loading="dataListLoading"
      highlight-current-row
      height="100%"
      :data="dataList"
      border
      :row-class-name="'row-1'"
    >
      <el-table-column prop="EXAM_TIME" :label="'检查时间'" width="160px" />
      <el-table-column prop="EXAM_TYPE" :label="'验光类型'" width="120px" header-align="center" align="center" />
      <el-table-column :label="'OD'" header-align="center">
        <el-table-column prop="OD_SPH" label="球镜" header-align="center" align="center" />
        <el-table-column prop="OD_CYL" label="柱镜" header-align="center" align="center" />
        <el-table-column prop="OD_AX" label="轴向" header-align="center" align="center" />
        <el-table-column prop="OD_SE" label="等效球镜" header-align="center" align="center" />
        <el-table-column prop="OD_VA" label="矫正视力" header-align="center" align="center" />
        <el-table-column prop="OD_VD" label="顶点距" header-align="center" align="center" />
        <el-table-column prop="OD_PS" label="瞳孔大小" header-align="center" align="center" />
        <el-table-column prop="S_OD_MEMO" label="备注" />
      </el-table-column>
      <el-table-column :label="'OS'" header-align="center">
        <el-table-column prop="OS_SPH" label="球镜" header-align="center" align="center" />
        <el-table-column prop="OS_CYL" label="柱镜" header-align="center" align="center" />
        <el-table-column prop="OS_AX" label="轴向" header-align="center" align="center" />
        <el-table-column prop="OS_SE" label="等效球镜" header-align="center" align="center" />
        <el-table-column prop="OS_VA" label="矫正视力" header-align="center" align="center" />
        <el-table-column prop="OS_VD" label="顶点距" header-align="center" align="center" />
        <el-table-column prop="OS_PS" label="瞳孔大小" header-align="center" align="center" />
        <el-table-column prop="S_OS_MEMO" label="备注" />
      </el-table-column>
    </el-table>
  </div>
</template>

<script>
import myMixin from './_mixin'

export default {
  mixins: [myMixin],
  data() {
    return {
      type: '验光'
    }
  }
}
</script>

<style lang="scss" scoped>
// .component-wrapper{
//   height: auto !important;
// }
</style>
