<template>
  <div class="component-wrapper">
    <el-table
      ref="dataList"
      v-loading="dataListLoading"
      highlight-current-row
      height="100%"
      :data="dataList"
      border
      :row-class-name="'row-1'"
    >
      <el-table-column prop="EXAM_TIME" :label="'检查时间'" width="155px" />
      <el-table-column prop="IOP_TYPE" :label="'检查类型'" width="155px" />
      <el-table-column prop="S_OD_IOP" :label="'OD'" />
      <el-table-column prop="S_OS_IOP" :label="'OS'" />
      <el-table-column prop="EXAM_MEMO" :label="'备注'" />
    </el-table>
  </div>
</template>

<script>
import myMixin from './_mixin'

export default {
  mixins: [myMixin],
  data() {
    return {
      type: '眼压'
    }
  }
}
</script>

<style lang="scss" scoped>
// .component-wrapper{
//   height: auto !important;
// }
</style>
